1 2 3 4 5 6 50

100

150

200

Mean Background PHA

1200

1282

1201 132 1295-1289

1290 1291

1292 1293

1297

1261

1218 1115

1241 1116-1152 171 143 1242 1298

LMCX1

N132D LMCX1

PSRB05 ARLac BG1 BG2 BG3 BG4 LMCX1

N132D 1099

N2516 1099

Cas A G21.5